           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.942507498006808E-004  0.000000000000000
   0.989294189891599  0.000000000000000
   0.992354895221692  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
