           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -9.934662688210663E-004  0.000000000000000
   1.00208666140877  0.000000000000000
   0.999152199809251  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
