           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.126780721746747E-004  0.000000000000000
   0.989195332463580  0.000000000000000
   0.992352286077943  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
