           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.405066771960190E-004  0.000000000000000
   0.989199370468116  0.000000000000000
   0.992109481088104  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
