           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.493673808271951E-004  0.000000000000000
   0.989095346121498  0.000000000000000
   0.992245375112628  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
