          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.648131604486258E-003  0.000000000000000
   1.00224871317709  0.000000000000000
   0.999189782479099  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
