          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -3.299261297539894E-004  0.000000000000000
   0.989090678900299  0.000000000000000
   0.992082240006880  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
