           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.035732037407917E-003  0.000000000000000
   1.00258241949885  0.000000000000000
   0.999881513164611  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
