           8           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -4.700214626302500E-004  0.000000000000000
   0.988996183399667  0.000000000000000
   0.991849803340992  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
