          52           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.763635887889182E-003  0.000000000000000
   1.00210776238992  0.000000000000000
   0.999044466526038  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
