          52           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -NaN  0.000000000000000
   INF  0.000000000000000
   INF  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
