          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.498300758122657E-003  0.000000000000000
   1.00200841711227  0.000000000000000
   0.999049381566988  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
