          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   2.823110360565441E-005  0.000000000000000
   0.988481692611832  0.000000000000000
   0.991600886664708  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
