          15           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.693424426226401E-004  0.000000000000000
   0.988384517141925  0.000000000000000
   0.991658294850654  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
