           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.618088221734695E-003  0.000000000000000
   1.00232614330631  0.000000000000000
   0.998929612325742  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
