           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   1.744743664207998E-005  0.000000000000000
   0.988323214096411  0.000000000000000
   0.991461391707743  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
