           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.812138882010927E-004  0.000000000000000
   1.00176795571852  0.000000000000000
   0.999741838084445  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
