           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.503264088960639E-004  0.000000000000000
   0.988784289859755  0.000000000000000
   0.991849222939439  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
