           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.466510128061473E-003  0.000000000000000
   1.00215753898247  0.000000000000000
   0.999232572478108  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
