           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.484635166223871E-004  0.000000000000000
   0.988654651118735  0.000000000000000
   0.991744595406818  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
