           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.446722965688070E-003  0.000000000000000
   1.00219517315666  0.000000000000000
   0.999337868949189  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
