           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.185105813892241E-004  0.000000000000000
   0.988672396954327  0.000000000000000
   0.991788362168555  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
