           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.346147108284324E-003  0.000000000000000
   1.00227620774979  0.000000000000000
   0.999299441083877  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
