           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.516615592910337E-004  0.000000000000000
   0.989203985756419  0.000000000000000
   0.992270275046807  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
