           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.323365092984115E-003  0.000000000000000
   1.00208390576998  0.000000000000000
   0.999429491131589  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
