           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.280757422037297E-004  0.000000000000000
   0.989173209432749  0.000000000000000
   0.992272598379840  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
