           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.678892174359566E-003  0.000000000000000
   1.00239884016229  0.000000000000000
   0.999328672509476  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
