           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.640852174832677E-004  0.000000000000000
   0.988994086853275  0.000000000000000
   0.992011444510129  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
