           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.479161526833724E-003  0.000000000000000
   1.00203187331445  0.000000000000000
   0.999446586103783  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
