           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.223455346326956E-004  0.000000000000000
   0.989302439781529  0.000000000000000
   0.992258562935820  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
