          32           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.473918131374806E-003  0.000000000000000
   1.00224763542069  0.000000000000000
   0.998940103572800  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
