          53           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.606857890776328E-003  0.000000000000000
   1.00210707659623  0.000000000000000
   0.998898971343798  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
