           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.411168228159187E-003  0.000000000000000
   1.00202331306017  0.000000000000000
   0.998916531373993  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
