           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.622173482834703E-003  0.000000000000000
   1.00180508991984  0.000000000000000
   0.998835471338722  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
