           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -9.949543516730534E-005  0.000000000000000
   0.988758262897703  0.000000000000000
   0.991748552031932  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
