           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -6.173857163284454E-005  0.000000000000000
   0.988809814708839  0.000000000000000
   0.991900787725748  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
