           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.751135980508362E-003  0.000000000000000
   1.00183225732407  0.000000000000000
   0.999035232749719  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
