           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.699000744779996E-004  0.000000000000000
   0.988462453134302  0.000000000000000
   0.991515002847149  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
