           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.764283613391838E-003  0.000000000000000
   1.00204094682089  0.000000000000000
   0.998619105996025  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
