           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.973408969965650E-004  0.000000000000000
   0.988594132099394  0.000000000000000
   0.991615467447859  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
