           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.246265024898253E-003  0.000000000000000
   1.00173390964672  0.000000000000000
   0.999021643107963  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
