           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.183083165930259E-004  0.000000000000000
   0.989150164402181  0.000000000000000
   0.992140517006691  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
