           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.429053246979253E-003  0.000000000000000
   1.00193692308970  0.000000000000000
   0.999131287755669  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
