           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -2.861864316961350E-004  0.000000000000000
   0.988974087012991  0.000000000000000
   0.991994005240024  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
