           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.295870414454295E-003  0.000000000000000
   1.00255506770347  0.000000000000000
   0.998928602636971  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
