          16           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.646698053950114E-003  0.000000000000000
   1.00199648259404  0.000000000000000
   0.998852933485977  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
