          16           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   5.863171271434903E-005  0.000000000000000
   0.988242093777363  0.000000000000000
   0.991220223418563  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
