          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.504221011338801E-003  0.000000000000000
   1.00207321425643  0.000000000000000
   0.998777182574089  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
