          55           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   8.857229997616503E-005  0.000000000000000
   0.988259586540309  0.000000000000000
   0.991290654612659  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
