           9           8
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000  0.000000000000000
  -1.850487940087686E-003  0.000000000000000
   1.00201311796159  0.000000000000000
   0.998801819078456  0.000000000000000
   0.000000000000000  0.000000000000000
   0.000000000000000  0.000000000000000
